c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(0.00150784514582254, -0.0497907368054486, 0.00434380644445338, 0.00218718976679278, -0.00434291403887011, 0.00302001293551759, 0.20336581169622, 0.00343296396767198, -0.0385920705103708, -0.00141334075132648, 0.0207373662562078, 0.0015000850140683, 0.0801600329536096, 0.113121841705728, -0.136274450655838, -0.0938571304025214, 0.00282123851288503, -0.00146833112673362, -0.00082584116000937, 0.0483281653119099, 0.00659062980994563, -0.00055535206472268)
c(`2.5%` = -0.550531966199477, `2.5%` = -0.629394891363134, `2.5%` = -0.527672919300448, `2.5%` = -0.509227038923741, `2.5%` = -0.550868934343651, `2.5%` = -0.542855202488396, `2.5%` = -0.225399121304215, `2.5%` = -0.534213624588921, `2.5%` = -0.57231251252735, `2.5%` = -0.552100213849103, `2.5%` = -0.419418356555291, `2.5%` = -0.567178469443596, `2.5%` = -0.370748780309252, `2.5%` = -0.318655190350014, `2.5%` = -0.614817809004343, `2.5%` = -0.703951782706409, `2.5%` = -0.524221538466178, `2.5%` = -0.541042128309509, 
`2.5%` = -0.553979099390109, `2.5%` = -0.429137673995, `2.5%` = -0.534659084619921, `2.5%` = -0.53134970116874)
c(`97.5%` = 0.566388836665101, `97.5%` = 0.445760030666272, `97.5%` = 0.550712495508801, `97.5%` = 0.510548679450175, `97.5%` = 0.543799039346651, `97.5%` = 0.546171328528686, `97.5%` = 0.932547573554047, `97.5%` = 0.562478415721886, `97.5%` = 0.429713264446548, `97.5%` = 0.509501648868077, `97.5%` = 0.482434252392398, `97.5%` = 0.552388649630916, `97.5%` = 0.655194288743027, `97.5%` = 0.700748091326741, `97.5%` = 0.205549966757929, `97.5%` = 0.348679606266848, `97.5%` = 0.523973004291571, `97.5%` = 0.52237026080622, 
`97.5%` = 0.551330298928471, `97.5%` = 0.607445504451599, `97.5%` = 0.557102597425807, `97.5%` = 0.509379389425598)
c(`5%` = -0.429366635609993, `5%` = -0.496218717595005, `5%` = -0.411147660889218, `5%` = -0.398570977236643, `5%` = -0.422007458084124, `5%` = -0.412200344995762, `5%` = -0.160763338289191, `5%` = -0.423552637832629, `5%` = -0.458333301038196, `5%` = -0.418097069598191, `5%` = -0.324235933898656, `5%` = -0.417261044253087, `5%` = -0.281885257093864, `5%` = -0.234540125743699, `5%` = -0.508687221040413, `5%` = -0.56179500309088, `5%` = -0.411556667615538, `5%` = -0.418938395029271, `5%` = -0.433526826335861, 
`5%` = -0.33703866498282, `5%` = -0.415046863367997, `5%` = -0.417110901717416)
c(`95%` = 0.433864705383823, `95%` = 0.34493920495178, `95%` = 0.421270429380312, `95%` = 0.402340857877479, `95%` = 0.396223107432888, `95%` = 0.417603923761695, `95%` = 0.749712378119009, `95%` = 0.423198808398514, `95%` = 0.339524038845502, `95%` = 0.410767571164308, `95%` = 0.384778572752778, `95%` = 0.427718825229051, `95%` = 0.522116792789822, `95%` = 0.572014784561829, `95%` = 0.15192983211524, `95%` = 0.262927135744447, `95%` = 0.408590937183379, `95%` = 0.414061379519885, `95%` = 0.424759632515887, 
`95%` = 0.478613866408021, `95%` = 0.43229047773505, `95%` = 0.400833024334571)
