c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.00832576787627327, 0.0502181175509121, -0.00254797568859221, 0.00037391254389325, -0.00114134588173891, -0.00451497853572214, -0.142153374440972, -0.00195287948710614, 0.0654719447924103, -0.00677887728466109, 0.345662047693858, -0.00157110819962499, 0.0149688400470326, -0.0782677724551585, -0.49791727768667, 0.0367700783674713, -0.00716063945233656, -0.00176465495021884, -0.00435528924328807, 0.043863405759711, -0.00548445340847891, -0.0100421324092617)
c(`2.5%` = -0.798176858708199, `2.5%` = -0.649287090985632, `2.5%` = -0.752180190601171, `2.5%` = -0.765720288201341, `2.5%` = -0.761310269145469, `2.5%` = -0.769404872006371, `2.5%` = -0.962752437012212, `2.5%` = -0.768468256092748, `2.5%` = -0.613672917773224, `2.5%` = -0.741396156335141, `2.5%` = -0.240225670397011, `2.5%` = -0.778550541201842, `2.5%` = -0.671882552677685, `2.5%` = -0.829702544391712, `2.5%` = -1.47884841599921, `2.5%` = -0.653709569493313, `2.5%` = -0.752391272912992, `2.5%` = -0.725938326026952, 
`2.5%` = -0.785753969844037, `2.5%` = -0.654434721761801, `2.5%` = -0.772385114493806, `2.5%` = -0.781547218625338)
c(`97.5%` = 0.76034469875563, `97.5%` = 0.845633947832787, `97.5%` = 0.770407348684183, `97.5%` = 0.814474757996063, `97.5%` = 0.781292873345278, `97.5%` = 0.779826237909694, `97.5%` = 0.494695385934057, `97.5%` = 0.766089116079086, `97.5%` = 0.858482468878284, `97.5%` = 0.747665756417337, `97.5%` = 1.31119870717426, `97.5%` = 0.791026840863526, `97.5%` = 0.72899311565112, `97.5%` = 0.558765218546179, `97.5%` = 0.0976524892433262, `97.5%` = 0.781833224643643, `97.5%` = 0.741470213490854, `97.5%` = 0.780312796382334, 
`97.5%` = 0.776445672109217, `97.5%` = 0.835951227522058, `97.5%` = 0.75578833553135, `97.5%` = 0.750101827954997)
c(`5%` = -0.616116918100389, `5%` = -0.512051758484746, `5%` = -0.589817478032612, `5%` = -0.60546319491298, `5%` = -0.583839532437199, `5%` = -0.599673916128779, `5%` = -0.771236336079563, `5%` = -0.595759768355798, `5%` = -0.47175814689012, `5%` = -0.585717774179175, `5%` = -0.156763845257426, `5%` = -0.590593736012543, `5%` = -0.529938547912805, `5%` = -0.669829197453793, `5%` = -1.26963007145184, `5%` = -0.508859660216102, `5%` = -0.602929326426733, `5%` = -0.573320601674407, `5%` = -0.611359700135997, 
`5%` = -0.497215940632518, `5%` = -0.609562003721472, `5%` = -0.603191340531708)
c(`95%` = 0.597088301775022, `95%` = 0.672111603595297, `95%` = 0.597359235347557, `95%` = 0.61918916388514, `95%` = 0.595716780090434, `95%` = 0.597426850327021, `95%` = 0.368655084080813, `95%` = 0.592458408903632, `95%` = 0.689843781266554, `95%` = 0.577350192007013, `95%` = 1.10666629752813, `95%` = 0.608146006908894, `95%` = 0.567469287801582, `95%` = 0.431936020918889, `95%` = 0.0306194413604995, `95%` = 0.619341630421946, `95%` = 0.574033327341637, `95%` = 0.591738000435572, `95%` = 0.598312121323889, 
`95%` = 0.645311247919002, `95%` = 0.587439430679619, `95%` = 0.583648949072352)
