c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.00486381271611535, -0.00234177649674774, -0.00515183815786496, -0.00421305648644563, -0.00389136209748, -0.00610673537139904, -0.0126249322314229, -0.00563946285209699, -0.00713553939645088, -0.00556109229654605, -0.0296681294218427, -0.00302065971753859, -0.0160603020475268, -0.0033204482574487, -0.00366894940571103, -0.0033782308159864, -0.00147263938060779, -0.00281902338049175, -0.00516465945474794, 0.00117504910800777, -0.00536819164938224, -0.00341714311862774)
c(`2.5%` = -0.4928902240148, `2.5%` = -0.471597568252128, `2.5%` = -0.507060592786285, `2.5%` = -0.496187329730551, `2.5%` = -0.493846364631587, `2.5%` = -0.512035468722232, `2.5%` = -0.503922991423901, `2.5%` = -0.499136678960227, `2.5%` = -0.498255016423811, `2.5%` = -0.479550877030934, `2.5%` = -0.527710057117981, `2.5%` = -0.47738578213782, `2.5%` = -0.504170004794057, `2.5%` = -0.488027036715767, `2.5%` = -0.508311086739842, `2.5%` = -0.488325893335097, `2.5%` = -0.500350365353871, `2.5%` = -0.489797593321065, 
`2.5%` = -0.493614948527939, `2.5%` = -0.478099940085293, `2.5%` = -0.480388926446991, `2.5%` = -0.480339298649014)
c(`97.5%` = 0.477181388655603, `97.5%` = 0.478253799598711, `97.5%` = 0.483897884400919, `97.5%` = 0.477733634248101, `97.5%` = 0.480671053527334, `97.5%` = 0.483026873590512, `97.5%` = 0.455687812451121, `97.5%` = 0.488335048561587, `97.5%` = 0.476215783846475, `97.5%` = 0.466429687492193, `97.5%` = 0.423734438029339, `97.5%` = 0.474465088221571, `97.5%` = 0.458565492328125, `97.5%` = 0.493372345702204, `97.5%` = 0.494169616877378, `97.5%` = 0.483648553653476, `97.5%` = 0.505031717406501, `97.5%` = 0.46569700208092, 
`97.5%` = 0.471415999038097, `97.5%` = 0.49621435196537, `97.5%` = 0.476743752937605, `97.5%` = 0.467403287438688)
c(`5%` = -0.384839256524113, `5%` = -0.370890653819468, `5%` = -0.389717242753722, `5%` = -0.382138541945515, `5%` = -0.371384438942403, `5%` = -0.390763667720738, `5%` = -0.387699039445137, `5%` = -0.394477291159571, `5%` = -0.39220012720177, `5%` = -0.380637632210929, `5%` = -0.411827047834269, `5%` = -0.374609901237044, `5%` = -0.39083922063065, `5%` = -0.387483535903527, `5%` = -0.390162763770864, `5%` = -0.37365571697494, `5%` = -0.381743220627302, `5%` = -0.369783694172149, `5%` = -0.385379188161294, 
`5%` = -0.373496126525493, `5%` = -0.377291769622258, `5%` = -0.368630128560942)
c(`95%` = 0.363815583651208, `95%` = 0.370227548106358, `95%` = 0.373524054930431, `95%` = 0.369698098361814, `95%` = 0.369300634866769, `95%` = 0.36794145288606, `95%` = 0.358137811206345, `95%` = 0.368909612747601, `95%` = 0.364170778673988, `95%` = 0.365633719092603, `95%` = 0.33048200014893, `95%` = 0.363053774138134, `95%` = 0.347229606528999, `95%` = 0.382089305066404, `95%` = 0.387514695717931, `95%` = 0.375728674172833, `95%` = 0.385485941672613, `95%` = 0.361659448576342, `95%` = 0.368353921113658, 
`95%` = 0.388511185198981, `95%` = 0.369886822399706, `95%` = 0.365593471311159)
