c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.107172841753111, -0.652217546171737, -0.158153468999919, -0.00872754000664511, -0.152469836074415, -0.00511048990810721, -0.432756950030333, -0.0176343397968463, -0.174941414466581, -0.312199818256478, -0.421462561969054, -0.00543187548165017, -1.41347612539297, 1.52465722253264, -1.24155955461637, 2.9333026125354, -0.0260562265370799, -0.00708575237043839, -0.236014521608801, -0.708583530845461, -0.00537911254785814, -0.115835951645073)
c(`2.5%` = -1.98999201263705, `2.5%` = -2.39214090710107, `2.5%` = -2.01846766579584, `2.5%` = -1.8757515797304, `2.5%` = -2.0334114088637, `2.5%` = -1.85212654123702, `2.5%` = -1.60516533489668, `2.5%` = -1.81993228600129, `2.5%` = -1.25821009021598, `2.5%` = -2.16646127648176, `2.5%` = -1.25120863703686, `2.5%` = -1.88684117832516, `2.5%` = -3.34866909602091, `2.5%` = 0.47643422496699, `2.5%` = -1.7911797031523, `2.5%` = 1.31489061844565, `2.5%` = -1.85712798081873, `2.5%` = -1.91898409412556, 
`2.5%` = -2.07179758391882, `2.5%` = -2.45975286581684, `2.5%` = -1.8878079254812, `2.5%` = -2.01296251650662)
c(`97.5%` = 1.7025058387162, `97.5%` = 0.881408586766731, `97.5%` = 1.65331806761982, `97.5%` = 1.81774079148411, `97.5%` = 1.66674910435877, `97.5%` = 1.86647987416102, `97.5%` = 0.645259664512326, `97.5%` = 1.80599008456882, `97.5%` = 0.856678839564855, `97.5%` = 1.41839221738041, `97.5%` = 0.360026899921426, `97.5%` = 1.89267030844417, `97.5%` = 0.201003318675158, `97.5%` = 2.69056887105094, `97.5%` = -0.715192981105914, `97.5%` = 4.78775173338893, `97.5%` = 1.83490876984593, `97.5%` = 1.88931228937232, 
`97.5%` = 1.5091000822795, `97.5%` = 0.802989438020258, `97.5%` = 1.86093048637463, `97.5%` = 1.70786218772968)
c(`5%` = -1.62973704571072, `5%` = -2.07294410260449, `5%` = -1.69801214255266, `5%` = -1.53184108821626, `5%` = -1.68584731697327, `5%` = -1.54481245603677, `5%` = -1.39759449940044, `5%` = -1.49900355048193, `5%` = -1.06880137117197, `5%` = -1.83763159160532, `5%` = -1.11103379908195, `5%` = -1.53234039460221, `5%` = -3.00363339456024, `5%` = 0.638951221037764, `5%` = -1.70700005124097, `5%` = 1.54171189173018, `5%` = -1.54285125721537, `5%` = -1.58329512208634, `5%` = -1.76844032673346, `5%` = -2.13894081007506, 
`5%` = -1.54263378199832, `5%` = -1.67735076532346)
c(`95%` = 1.41879257978458, `95%` = 0.648571235197482, `95%` = 1.33700306317695, `95%` = 1.49389338436903, `95%` = 1.3461526982071, `95%` = 1.50194445717269, `95%` = 0.481912048276356, `95%` = 1.48993841444006, `95%` = 0.70167186942968, `95%` = 1.12285471327414, `95%` = 0.252246900593004, `95%` = 1.55595453136487, `95%` = -0.0371324515642565, `95%` = 2.48090816148459, `95%` = -0.797626914298678, `95%` = 4.47581369319019, `95%` = 1.48349835052459, `95%` = 1.55512904554564, `95%` = 1.23036073907808, 
`95%` = 0.570893677970625, `95%` = 1.51891783905047, `95%` = 1.38398983193578)
