c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.101589582550983, -0.55509837146517, -0.0876297898120394, -0.00424167706294526, -0.0856815547958816, -0.000891733412756743, -0.656064432872784, -0.00724344466650777, 1.39799100967958, -0.162272605765493, 0.674878170950668, 0.00679859198995776, 0.256393632879033, -1.39692218698997, 0.469486930453339, 0.201756832022176, -0.000743046330130356, -0.00239703676867723, -0.101293376110023, 0.334667664170298, 0.0036268316699096, -0.0553940979488865)
c(`2.5%` = -1.50442203323384, `2.5%` = -1.84877532048521, `2.5%` = -1.4700191365573, `2.5%` = -1.37500277258178, `2.5%` = -1.4848837602478, `2.5%` = -1.32756197431566, `2.5%` = -1.85894539233901, `2.5%` = -1.33085969325607, `2.5%` = 0.16999404397094, `2.5%` = -1.53594319207073, `2.5%` = -0.0683721763680483, `2.5%` = -1.33523195430546, `2.5%` = -0.987723094632562, `2.5%` = -2.58976230693659, `2.5%` = 0.0834766521350615, `2.5%` = -0.475822349223494, `2.5%` = -1.33731236431054, `2.5%` = -1.35448275771273, 
`2.5%` = -1.42832958185923, `2.5%` = -0.797988116140275, `2.5%` = -1.3168218907587, `2.5%` = -1.41268885278703)
c(`97.5%` = 1.22021244556502, `97.5%` = 0.475219087766019, `97.5%` = 1.2205452457074, `97.5%` = 1.38725107457264, `97.5%` = 1.24763911953619, `97.5%` = 1.36828112117342, `97.5%` = 0.304797046306457, `97.5%` = 1.2809727123191, `97.5%` = 2.97850864225959, `97.5%` = 1.1200916681713, `97.5%` = 1.48172994699915, `97.5%` = 1.35752400157911, `97.5%` = 1.59974497777273, `97.5%` = -0.420429798817082, `97.5%` = 0.874242905367939, `97.5%` = 0.869912231337424, `97.5%` = 1.32550284173821, `97.5%` = 1.35888949832736, 
`97.5%` = 1.1936539738932, `97.5%` = 1.609867105785, `97.5%` = 1.34949094435626, `97.5%` = 1.22944948085911)
c(`5%` = -1.22562889252442, `5%` = -1.59673376165319, `5%` = -1.21885811476843, `5%` = -1.11813404961243, `5%` = -1.20918844446486, `5%` = -1.07055731145333, `5%` = -1.6236745264581, `5%` = -1.07506861425794, `5%` = 0.318380069304849, `5%` = -1.29675430841515, `5%` = 0.041344205634408, `5%` = -1.10591252208745, `5%` = -0.740508923444193, `5%` = -2.36760582705321, `5%` = 0.147263440981433, `5%` = -0.359590775683247, `5%` = -1.09935756841891, `5%` = -1.10179682888056, `5%` = -1.19332341912876, `5%` = -0.607636638304879, 
`5%` = -1.08485266813522, `5%` = -1.13445756592737)
c(`95%` = 0.972806121648346, `95%` = 0.338841318556515, `95%` = 0.988158619006595, `95%` = 1.09780676333781, `95%` = 1.00794578824477, `95%` = 1.1020724405486, `95%` = 0.184033329014398, `95%` = 1.04560505760623, `95%` = 2.69222620971344, `95%` = 0.884777865331596, `95%` = 1.35166837167041, `95%` = 1.11527199108615, `95%` = 1.36231797243719, `95%` = -0.54782380504844, `95%` = 0.80963853468214, `95%` = 0.767827618485196, `95%` = 1.08512970421361, `95%` = 1.08918975608724, `95%` = 0.953418962916104, 
`95%` = 1.37967304828955, `95%` = 1.09273387336662, `95%` = 1.00375347161432)
