c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.0338934915059191, -0.0424617202550975, -0.0299850538975256, -0.0228882519097089, -0.0337281404548882, -0.0258485686453499, -0.0402405594871021, -0.0253886763112486, -0.136200903561077, -0.0212623461765324, -0.102097548934776, -0.0229996389940294, -0.106049590275806, 0.103092606051222, -0.431577879697863, -0.0589099972525265, -0.0270810088184279, -0.0260112735850109, -0.0325654806803472, -0.182061588936881, -0.0261135283573324, -0.0227456753432774)
c(`2.5%` = -0.690100665844187, `2.5%` = -0.671202369164881, `2.5%` = -0.666088312766176, `2.5%` = -0.666578142141343, `2.5%` = -0.678544709698103, `2.5%` = -0.669196847024182, `2.5%` = -0.655923003454131, `2.5%` = -0.655413313800275, `2.5%` = -0.845732099866594, `2.5%` = -0.653192374517221, `2.5%` = -0.64122257390992, `2.5%` = -0.659159394086157, `2.5%` = -0.787764109870441, `2.5%` = -0.425148647750428, `2.5%` = -1.00072959307916, `2.5%` = -0.69270592355035, `2.5%` = -0.685883418294076, `2.5%` = -0.679342853679393, 
`2.5%` = -0.681272654592773, `2.5%` = -0.837786199816108, `2.5%` = -0.665616824031369, `2.5%` = -0.6589068176532)
c(`97.5%` = 0.607853806397433, `97.5%` = 0.575243002929989, `97.5%` = 0.623466621187216, `97.5%` = 0.641896362473495, `97.5%` = 0.611672327879679, `97.5%` = 0.621633709372348, `97.5%` = 0.556891230159617, `97.5%` = 0.626653736033388, `97.5%` = 0.426452209102124, `97.5%` = 0.604814400002199, `97.5%` = 0.370375731808055, `97.5%` = 0.656507843091209, `97.5%` = 0.463728458888126, `97.5%` = 0.803945161990884, `97.5%` = 0.00182348352747238, `97.5%` = 0.534212402242803, `97.5%` = 0.609945240239135, `97.5%` = 0.637145158270836, 
`97.5%` = 0.595960590167125, `97.5%` = 0.325103240011011, `97.5%` = 0.639977001719915, `97.5%` = 0.645740444211412)
c(`5%` = -0.543756319725243, `5%` = -0.53599965672411, `5%` = -0.53861642350383, `5%` = -0.536297908680718, `5%` = -0.535626704345617, `5%` = -0.534014891414532, `5%` = -0.515645442393892, `5%` = -0.521060513099755, `5%` = -0.698732119314075, `5%` = -0.513828973026094, `5%` = -0.536163536290694, `5%` = -0.520608887905471, `5%` = -0.637108697299896, `5%` = -0.333645087620771, `5%` = -0.901047800865227, `5%` = -0.558977042638121, `5%` = -0.528351288300235, `5%` = -0.531154576765547, `5%` = -0.535401625627599, 
`5%` = -0.704974120731683, `5%` = -0.530102478693174, `5%` = -0.519892009691237)
c(`95%` = 0.476219882900217, `95%` = 0.43869836398252, `95%` = 0.487869109380049, `95%` = 0.495857205487324, `95%` = 0.477771545962831, `95%` = 0.479824548055006, `95%` = 0.431579111164995, `95%` = 0.489104423628694, `95%` = 0.318624951651975, `95%` = 0.475052338519103, `95%` = 0.285016338923033, `95%` = 0.498321179113614, `95%` = 0.356019293245049, `95%` = 0.645249978382246, `95%` = -0.0484915873069474, `95%` = 0.422234919504667, `95%` = 0.474969816313099, `95%` = 0.495469548426488, `95%` = 0.459482254828791, 
`95%` = 0.237533499815169, `95%` = 0.491700443982918, `95%` = 0.504132013362862)
