c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.00425037969860381, 0.0520276498659513, -0.00694549624406402, -0.00329085969226689, -0.00388840876060019, -0.00333363363166412, -0.127643497298759, -0.00607830042553752, -0.00458743018336106, -0.00101912359668589, 0.313015599215921, -0.00831148301934241, 0.0205869638597122, -0.0469323353070514, -0.462480676283058, 0.0112324599145869, -0.00721063860636367, -0.0035293929626479, -0.00822057460636666, 0.0363376534270052, -0.00541540343212307, -0.012057696951739)
c(`2.5%` = -0.70780711385627, `2.5%` = -0.594326262346778, `2.5%` = -0.7252146313351, `2.5%` = -0.687684961694459, `2.5%` = -0.711036596620767, `2.5%` = -0.70766241424671, `2.5%` = -0.934517717044905, `2.5%` = -0.740064591785704, `2.5%` = -0.698692690737957, `2.5%` = -0.700492519587133, `2.5%` = -0.233595610789792, `2.5%` = -0.727092802682495, `2.5%` = -0.650164700792049, `2.5%` = -0.742835324823262, `2.5%` = -1.38061563420554, `2.5%` = -0.671365303582674, `2.5%` = -0.699392884557989, `2.5%` = -0.708831031951471, 
`2.5%` = -0.699339789063765, `2.5%` = -0.638236325260894, `2.5%` = -0.701062300495726, `2.5%` = -0.725881427770042)
c(`97.5%` = 0.694261267867511, `97.5%` = 0.808370421778, `97.5%` = 0.71857091792699, `97.5%` = 0.712946413360977, `97.5%` = 0.700586024127442, `97.5%` = 0.705642409581787, `97.5%` = 0.47662240088646, `97.5%` = 0.715152280978821, `97.5%` = 0.705869821256914, `97.5%` = 0.709145642532572, `97.5%` = 1.20992585448287, `97.5%` = 0.70061083692136, `97.5%` = 0.718849094670325, `97.5%` = 0.568899607556996, `97.5%` = 0.104732943062095, `97.5%` = 0.720181839443808, `97.5%` = 0.688106266166368, `97.5%` = 0.707766692238027, 
`97.5%` = 0.721691092091147, `97.5%` = 0.770894977353144, `97.5%` = 0.68558083468531, `97.5%` = 0.683252599348493)
c(`5%` = -0.545084439558284, `5%` = -0.466949528217852, `5%` = -0.551976465006553, `5%` = -0.539997263145208, `5%` = -0.54539560131478, `5%` = -0.556260106186225, `5%` = -0.738780680394586, `5%` = -0.561306218045859, `5%` = -0.551502493771384, `5%` = -0.546083399551661, `5%` = -0.161074039282134, `5%` = -0.555344193461515, `5%` = -0.498641943680582, `5%` = -0.591432650332965, `5%` = -1.20489418265913, `5%` = -0.515813890336007, `5%` = -0.552054088083872, `5%` = -0.55020507369394, `5%` = -0.556300894016423, 
`5%` = -0.492564658026736, `5%` = -0.554790007362211, `5%` = -0.579973284911488)
c(`95%` = 0.553059529514475, `95%` = 0.642139702398628, `95%` = 0.544357493857437, `95%` = 0.543500493140995, `95%` = 0.539169219640597, `95%` = 0.548373871850184, `95%` = 0.358209361444831, `95%` = 0.556290410504708, `95%` = 0.545415570927546, `95%` = 0.562343270037985, `95%` = 1.02393998056565, `95%` = 0.545395535232622, `95%` = 0.559285332586046, `95%` = 0.451373126077815, `95%` = 0.0412518775283032, `95%` = 0.567163141840564, `95%` = 0.532917967472569, `95%` = 0.539341562183807, `95%` = 0.540100046399289, 
`95%` = 0.603219377955483, `95%` = 0.544721978960424, `95%` = 0.526520749932044)
