c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.125442261211977, -0.634380387397337, -0.0904008833677747, 0.00457262029843023, -0.0977459511882078, -0.00342950020070609, -0.782900034161243, 0.0108436831438867, -0.188374223876446, -0.206474952455297, 0.683684529972769, 0.00548430316942234, -0.182991008984818, -1.12108775912607, 0.750982081375159, 2.03676834465289, 0.00699288017040605, 0.00132293660677052, -0.135998389474531, 0.355597503912652, -0.000748592138369246, -0.0790514032371737)
c(`2.5%` = -1.6717536000709, `2.5%` = -2.08571594629629, `2.5%` = -1.64785547181564, `2.5%` = -1.48296587962211, `2.5%` = -1.63536711477685, `2.5%` = -1.50416531815294, `2.5%` = -2.00580276680818, `2.5%` = -1.50687527570181, `2.5%` = -1.72259104935088, `2.5%` = -1.72037083420143, `2.5%` = -0.065419959325911, `2.5%` = -1.54915125264042, `2.5%` = -1.71289110665745, `2.5%` = -2.12074889567902, `2.5%` = 0.331877791679706, `2.5%` = 0.708058159336893, `2.5%` = -1.50356434136233, `2.5%` = -1.55304690191622, 
`2.5%` = -1.62823539969415, `2.5%` = -0.91686956167729, `2.5%` = -1.50106844155324, `2.5%` = -1.58441081300341)
c(`97.5%` = 1.37454474633763, `97.5%` = 0.5895805408074, `97.5%` = 1.37590552412216, `97.5%` = 1.50596230739552, `97.5%` = 1.37267037163083, `97.5%` = 1.48661502413085, `97.5%` = 0.264875526831466, `97.5%` = 1.54097458087377, `97.5%` = 1.26193238790215, `97.5%` = 1.2012065202035, `97.5%` = 1.45484130643615, `97.5%` = 1.55098554088183, `97.5%` = 1.25470210706401, `97.5%` = -0.18706586519614, `97.5%` = 1.16526480888199, `97.5%` = 3.60035882967352, `97.5%` = 1.54947042178867, `97.5%` = 1.56236199246706, 
`97.5%` = 1.319219525961, `97.5%` = 1.68556389544589, `97.5%` = 1.49275902446537, `97.5%` = 1.40846238355701)
c(`5%` = -1.3691839479096, `5%` = -1.83090358635925, `5%` = -1.34808876420438, `5%` = -1.21056001285591, `5%` = -1.33063974818463, `5%` = -1.22133997878743, `5%` = -1.77918727259341, `5%` = -1.22000395808388, `5%` = -1.43935573234917, `5%` = -1.44642788030542, `5%` = 0.0501521959809474, `5%` = -1.26463737751244, `5%` = -1.43574526702315, `5%` = -1.96383338722353, `5%` = 0.405167331678651, `5%` = 0.884703609533978, `5%` = -1.23872204835182, `5%` = -1.24808071124386, `5%` = -1.35127368102193, `5%` = -0.67458579540421, 
`5%` = -1.20764155814797, `5%` = -1.31529358978633)
c(`95%` = 1.08689610282864, `95%` = 0.411373708954524, `95%` = 1.09706839061323, `95%` = 1.21340386433451, `95%` = 1.10177406553501, `95%` = 1.21233667623652, `95%` = 0.10392944357601, `95%` = 1.24972099901061, `95%` = 1.01895871997513, `95%` = 0.974005326272706, `95%` = 1.3349917174215, `95%` = 1.25512780215156, `95%` = 0.998440118744661, `95%` = -0.325114325462184, `95%` = 1.09782704884613, `95%` = 3.29771164731612, `95%` = 1.2431558957471, `95%` = 1.26567362466043, `95%` = 1.05534697103267, `95%` = 1.43038671095271, 
`95%` = 1.21674851017095, `95%` = 1.13002411965399)
