c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.0839695736338329, -0.492082105294562, -0.109501095535462, -0.0196740674728599, -0.100176238372831, -0.00245262511220055, -0.321179541654107, -0.00865819806821298, -0.171255679770685, -0.189160205568599, -0.410002962985084, -0.00472153674211645, -0.965492498929888, 0.981904643289203, -1.42212379946949, 1.4343145281794, -0.0179450032286054, -0.00246803585670436, -0.154938587229359, -0.484800071266936, -0.0222562328225416, -0.0715218070423589)
c(`2.5%` = -1.53834218511699, `2.5%` = -1.90511422940208, `2.5%` = -1.5868664834118, `2.5%` = -1.44783687508376, `2.5%` = -1.59229569755844, `2.5%` = -1.46711587016748, `2.5%` = -1.38955251675308, `2.5%` = -1.43974259249325, `2.5%` = -1.61513700134403, `2.5%` = -1.67332906770044, `2.5%` = -1.17468261714707, `2.5%` = -1.49080796927598, `2.5%` = -2.60970766749696, `2.5%` = 0.1395515263723, `2.5%` = -1.94579183442618, `2.5%` = 0.205211516738727, `2.5%` = -1.45858246672384, `2.5%` = -1.45638231455129, 
`2.5%` = -1.57432527583651, `2.5%` = -1.89430439178029, `2.5%` = -1.49545479956933, `2.5%` = -1.52181837877023)
c(`97.5%` = 1.38025286573102, `97.5%` = 0.671888359135513, `97.5%` = 1.31849879169171, `97.5%` = 1.41725878261398, `97.5%` = 1.34668150130194, `97.5%` = 1.48949502898908, `97.5%` = 0.649466307918394, `97.5%` = 1.42115487180886, `97.5%` = 1.20326996986, `97.5%` = 1.21724517813791, `97.5%` = 0.346653154116167, `97.5%` = 1.49306461451315, `97.5%` = 0.352152451167178, `97.5%` = 1.91303164519959, `97.5%` = -0.897122825571582, `97.5%` = 2.9807308772601, `97.5%` = 1.43437143713252, `97.5%` = 1.42038949647652, 
`97.5%` = 1.23155938689582, `97.5%` = 0.74983930327188, `97.5%` = 1.41424715743962, `97.5%` = 1.36093173401006)
c(`5%` = -1.27595970479715, `5%` = -1.61232610017923, `5%` = -1.27900942368827, `5%` = -1.20911517348991, `5%` = -1.32128360503802, `5%` = -1.21361120239116, `5%` = -1.20365166856666, `5%` = -1.17624699441702, `5%` = -1.36479973315175, `5%` = -1.39909398703585, `5%` = -1.0336344603454, `5%` = -1.21290827253529, `5%` = -2.30944484222019, `5%` = 0.267683359966716, `5%` = -1.86296688100473, `5%` = 0.381605043104683, `5%` = -1.19601532548943, `5%` = -1.18363951308212, `5%` = -1.33073719729411, `5%` = -1.63161252524388, 
`5%` = -1.21908671192234, `5%` = -1.27957820911059)
c(`95%` = 1.11407679146481, `95%` = 0.505022672124414, `95%` = 1.05097584662717, `95%` = 1.16730481145521, `95%` = 1.07597310447015, `95%` = 1.21143522358816, `95%` = 0.488909460910419, `95%` = 1.17806858826118, `95%` = 0.959454090167079, `95%` = 0.957547157299822, `95%` = 0.222541387038459, `95%` = 1.21987772385594, `95%` = 0.142406345566596, `95%` = 1.75092182976244, `95%` = -0.982467346487132, `95%` = 2.69087324260631, `95%` = 1.13211732275921, `95%` = 1.19337817132644, `95%` = 0.996064978289392, 
`95%` = 0.539558567697874, `95%` = 1.17875353328357, `95%` = 1.10999488109643)
