c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.0237365060797679, -0.0388174949875695, -0.0231526242035451, -0.0209577446326871, -0.027314122100858, -0.0215244314496299, -0.0359624211361879, -0.0225036301806477, -0.0279957787956102, -0.0223807012415064, -0.0793030252420072, -0.0237173551959939, -0.0935599165790394, 0.0972950744469196, -0.322582052176165, -0.0434069805779893, -0.0199335486549313, -0.0204795276580006, -0.0284544301180572, -0.145194792404081, -0.0222792039022204, -0.0214430636306466)
c(`2.5%` = -0.59106788142739, `2.5%` = -0.580677937215321, `2.5%` = -0.587918879892969, `2.5%` = -0.55281039791184, `2.5%` = -0.604245301024113, `2.5%` = -0.595931714808207, `2.5%` = -0.579440352911549, `2.5%` = -0.589039472487206, `2.5%` = -0.569695418651698, `2.5%` = -0.579794486230475, `2.5%` = -0.583434624344359, `2.5%` = -0.583219946382591, `2.5%` = -0.686559815852681, `2.5%` = -0.376651921398821, `2.5%` = -0.87294329504073, `2.5%` = -0.609172939750732, `2.5%` = -0.584337112719154, `2.5%` = -0.583293589609277, 
`2.5%` = -0.601588648239903, `2.5%` = -0.724681033559513, `2.5%` = -0.596510548152936, `2.5%` = -0.582124509747406)
c(`97.5%` = 0.549834882256126, `97.5%` = 0.509887927988716, `97.5%` = 0.539199052037213, `97.5%` = 0.54008714057243, `97.5%` = 0.546339569374801, `97.5%` = 0.550303379278163, `97.5%` = 0.502125713791806, `97.5%` = 0.553605811375964, `97.5%` = 0.516423378864606, `97.5%` = 0.555966194025452, `97.5%` = 0.35398311863773, `97.5%` = 0.540490262418071, `97.5%` = 0.403955344856024, `97.5%` = 0.734390689296967, `97.5%` = 0.0587853501781265, `97.5%` = 0.505940471844121, `97.5%` = 0.544662560573446, `97.5%` = 0.545608520025173, 
`97.5%` = 0.522132154560519, `97.5%` = 0.296626779745263, `97.5%` = 0.552841579041728, `97.5%` = 0.55123420584877)
c(`5%` = -0.465349868987497, `5%` = -0.473224198039299, `5%` = -0.454316484703311, `5%` = -0.449045262802595, `5%` = -0.478277339252247, `5%` = -0.463099177375116, `5%` = -0.471325224304299, `5%` = -0.469833251610556, `5%` = -0.4585010574341, `5%` = -0.467216016692461, `5%` = -0.474208313604929, `5%` = -0.465656294277997, `5%` = -0.557084729322387, `5%` = -0.286576879837866, `5%` = -0.771468634715759, `5%` = -0.485901259502674, `5%` = -0.457455326022601, `5%` = -0.465370255722444, `5%` = -0.471844495251401, 
`5%` = -0.60663639182431, `5%` = -0.464142542323832, `5%` = -0.471211070882173)
c(`95%` = 0.417747567605106, `95%` = 0.385793472918771, `95%` = 0.414272283018265, `95%` = 0.427289782694826, `95%` = 0.431271380493192, `95%` = 0.432324802972589, `95%` = 0.385472437795313, `95%` = 0.424370146622297, `95%` = 0.400343971015968, `95%` = 0.430289977214669, `95%` = 0.276270359667977, `95%` = 0.416549193616834, `95%` = 0.299691249678505, `95%` = 0.591165271809376, `95%` = 0.0150882242203145, `95%` = 0.390738341658563, `95%` = 0.423538020411479, `95%` = 0.427112283428098, `95%` = 0.404711638977595, 
`95%` = 0.219603023365579, `95%` = 0.424367567647065, `95%` = 0.426370304122681)
