c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.0356872678051164, -0.00168811312747167, -0.040772450833773, -0.0341295396740508, -0.0322797756928929, -0.0321252414552999, -0.221557156054218, -0.0337834431778614, -0.0408676448107963, -0.0366971604758617, -0.240244925217888, -0.033194017550941, -0.200263144507699, -0.246549007057626, -0.391115168851617, -0.0261667863864122, -0.0349391488939177, -0.0320976112580892, -0.0410148199139907, -0.152476010443095, -0.0338355056959803, -0.0367444967033869)
c(`2.5%` = -0.706590813904093, `2.5%` = -0.642026975659904, `2.5%` = -0.697711370058256, `2.5%` = -0.690391522038681, `2.5%` = -0.698041661410238, `2.5%` = -0.676482912494113, `2.5%` = -0.973157147545243, `2.5%` = -0.700846560913017, `2.5%` = -0.719365627727127, `2.5%` = -0.698432906368924, `2.5%` = -0.87651952700298, `2.5%` = -0.699046185415651, `2.5%` = -0.94394301268436, `2.5%` = -1.00366111249057, `2.5%` = -1.01411677983288, `2.5%` = -0.636644765202698, `2.5%` = -0.717193539573276, `2.5%` = -0.720247115196323, 
`2.5%` = -0.712856989208935, `2.5%` = -0.873504809302228, `2.5%` = -0.70228275809258, `2.5%` = -0.703044249394869)
c(`97.5%` = 0.635740388531593, `97.5%` = 0.692401928546005, `97.5%` = 0.644353373854409, `97.5%` = 0.634544683879137, `97.5%` = 0.648022461446708, `97.5%` = 0.650835318913872, `97.5%` = 0.316983904931957, `97.5%` = 0.652662941397892, `97.5%` = 0.621431409609209, `97.5%` = 0.640989465829257, `97.5%` = 0.23537143938282, `97.5%` = 0.64069103107391, `97.5%` = 0.358893861662799, `97.5%` = 0.271962205186355, `97.5%` = 0.0583828784296896, `97.5%` = 0.618116456875924, `97.5%` = 0.627789573055541, `97.5%` = 0.660056576525587, 
`97.5%` = 0.652606458105825, `97.5%` = 0.418305089489921, `97.5%` = 0.67125888646248, `97.5%` = 0.642124349089325)
c(`5%` = -0.550956992904975, `5%` = -0.508041453428566, `5%` = -0.563126505853213, `5%` = -0.565333950659683, `5%` = -0.554354309446204, `5%` = -0.542521402655654, `5%` = -0.809161127277071, `5%` = -0.570042651392966, `5%` = -0.578177327158022, `5%` = -0.553466249874256, `5%` = -0.744994092308559, `5%` = -0.564002786220583, `5%` = -0.79139378228791, `5%` = -0.849782529590805, `5%` = -0.888767779590734, `5%` = -0.52029100814471, `5%` = -0.562403466038745, `5%` = -0.570854727997741, `5%` = -0.56083436437509, 
`5%` = -0.722302029118797, `5%` = -0.560672155131224, `5%` = -0.566427691976467)
c(`95%` = 0.49921617249493, `95%` = 0.539888713167615, `95%` = 0.491336618459837, `95%` = 0.496096855549579, `95%` = 0.488196928005039, `95%` = 0.504500383918774, `95%` = 0.22061302615814, `95%` = 0.50763842075058, `95%` = 0.490547427008517, `95%` = 0.5024220439598, `95%` = 0.160459280321308, `95%` = 0.508241776378691, `95%` = 0.255397789964286, `95%` = 0.184765724564457, `95%` = 0.00220068103113155, `95%` = 0.473605030682722, `95%` = 0.502086057276485, `95%` = 0.502388739081777, `95%` = 0.492126790714092, 
`95%` = 0.313618294370934, `95%` = 0.511171244847726, `95%` = 0.488474582283021)
