c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.00453004445128726, -0.0487882643350839, 0.00388324398875035, 0.00600030897715551, -0.00538610417285804, 0.00772537385203624, 0.212814382541755, 0.0103546585393891, -0.00219739990464421, 0.00573547993633034, 0.0210696383213873, 0.00382326626946433, 0.0890290072803951, 0.118862788038463, -0.153070251526815, -0.0300495917654117, 0.00632693558951951, 0.00686062215015545, -0.000134290900666971, 0.0538518027914453, 0.0067852977037269, 0.00444722699882794)
c(`2.5%` = -0.522473467151954, `2.5%` = -0.629355920785815, `2.5%` = -0.563978773920117, `2.5%` = -0.535432036777299, `2.5%` = -0.547028839097524, `2.5%` = -0.536401559610976, `2.5%` = -0.216790926226796, `2.5%` = -0.547248878421194, `2.5%` = -0.546024664925017, `2.5%` = -0.555045837090003, `2.5%` = -0.441569222608919, `2.5%` = -0.536935757859788, `2.5%` = -0.360251490641265, `2.5%` = -0.322864100327864, `2.5%` = -0.647099460522259, `2.5%` = -0.579952442420161, `2.5%` = -0.543774959491397, `2.5%` = -0.534317244933372, 
`2.5%` = -0.545741442414024, `2.5%` = -0.441269239429757, `2.5%` = -0.543562151946732, `2.5%` = -0.549318626516662)
c(`97.5%` = 0.521050827265422, `97.5%` = 0.437305818019008, `97.5%` = 0.529716007011035, `97.5%` = 0.544430091969286, `97.5%` = 0.515599851493812, `97.5%` = 0.571254185861391, `97.5%` = 0.947012674771204, `97.5%` = 0.563106046915962, `97.5%` = 0.536012692353226, `97.5%` = 0.551334734198655, `97.5%` = 0.493590414145303, `97.5%` = 0.531688870459631, `97.5%` = 0.653178363051581, `97.5%` = 0.707848346844139, `97.5%` = 0.200836306411785, `97.5%` = 0.46700168455864, `97.5%` = 0.55501322279541, `97.5%` = 0.559360718630685, 
`97.5%` = 0.529476040519034, `97.5%` = 0.616981750019738, `97.5%` = 0.555288145061246, `97.5%` = 0.566786398732341)
c(`5%` = -0.419232231166099, `5%` = -0.494798169976347, `5%` = -0.42258487608435, `5%` = -0.403599534929105, `5%` = -0.425542097315849, `5%` = -0.409206631802767, `5%` = -0.155069763071105, `5%` = -0.427750837955659, `5%` = -0.422785852222731, `5%` = -0.418611961249901, `5%` = -0.345001792538537, `5%` = -0.417445127557205, `5%` = -0.272800883596647, `5%` = -0.239052465940946, `5%` = -0.542569734384912, `5%` = -0.46428182787326, `5%` = -0.41832175307383, `5%` = -0.412143756821372, `5%` = -0.423339859632688, 
`5%` = -0.341078007765104, `5%` = -0.414497039997972, `5%` = -0.427598414623105)
c(`95%` = 0.40930413280727, `95%` = 0.335431104413784, `95%` = 0.418199256179212, `95%` = 0.422320950945946, `95%` = 0.405983928954471, `95%` = 0.446199810548468, `95%` = 0.771003878094919, `95%` = 0.445272729713247, `95%` = 0.409249197193782, `95%` = 0.4340297565346, `95%` = 0.397235475562926, `95%` = 0.41621191535763, `95%` = 0.5354778771933, `95%` = 0.583491976764975, `95%` = 0.146594017297049, `95%` = 0.355265905726475, `95%` = 0.444310196673993, `95%` = 0.432673021127983, `95%` = 0.404697464194665, 
`95%` = 0.491799958125016, `95%` = 0.435963195935617, `95%` = 0.429229280272728)
