c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-3.67876230607321e-05, -0.00420544695989984, -0.00364348124813704, -0.00291662083314147, -0.00127394850655207, -0.00296168450681433, -0.0138667209542896, -0.00119057427895234, -0.00475038293457433, -0.00387370578947635, -0.0319054238096691, -0.00540464874127915, -0.0146497145987768, -0.00632918642884552, -0.00239195482020883, -0.00480659943471074, -0.00187482127808104, -0.00261361052577467, -0.00146956159362431, 0.00149825743754654, -0.000168656231690738, -0.00515623270496441)
c(`2.5%` = -0.476996093228054, `2.5%` = -0.492339412725189, `2.5%` = -0.486321618209511, `2.5%` = -0.462830472897099, `2.5%` = -0.482547609042035, `2.5%` = -0.470816024295561, `2.5%` = -0.515476535562455, `2.5%` = -0.483294312329889, `2.5%` = -0.486669016974439, `2.5%` = -0.491805733757852, `2.5%` = -0.525407443130088, `2.5%` = -0.506905210695365, `2.5%` = -0.499533015362412, `2.5%` = -0.457655580540547, `2.5%` = -0.468281595468319, `2.5%` = -0.493930299634033, `2.5%` = -0.491781074950629, `2.5%` = -0.495214949068811, 
`2.5%` = -0.481250791894886, `2.5%` = -0.47309813378072, `2.5%` = -0.476362703958553, `2.5%` = -0.497813936204529)
c(`97.5%` = 0.46973616324388, `97.5%` = 0.478982977005595, `97.5%` = 0.488377886456392, `97.5%` = 0.470734349815259, `97.5%` = 0.471731892727332, `97.5%` = 0.464019043168922, `97.5%` = 0.454904726018055, `97.5%` = 0.480776937102239, `97.5%` = 0.4773406365389, `97.5%` = 0.481655471647827, `97.5%` = 0.399015448351366, `97.5%` = 0.474284382576303, `97.5%` = 0.43698314079323, `97.5%` = 0.452830824807258, `97.5%` = 0.4785048828174, `97.5%` = 0.472879759036545, `97.5%` = 0.472421304769591, `97.5%` = 0.496141774488885, 
`97.5%` = 0.471526596519446, `97.5%` = 0.502995178525313, `97.5%` = 0.467792022647372, `97.5%` = 0.478962651483817)
c(`5%` = -0.361246264758624, `5%` = -0.381917066665734, `5%` = -0.383811060861621, `5%` = -0.367778441281022, `5%` = -0.37903606269765, `5%` = -0.36689865770687, `5%` = -0.393237237690441, `5%` = -0.369236154947112, `5%` = -0.381641613228118, `5%` = -0.386356944965196, `5%` = -0.407145610958877, `5%` = -0.38403492126543, `5%` = -0.388010301742696, `5%` = -0.365099832761715, `5%` = -0.367271272187763, `5%` = -0.372087147651722, `5%` = -0.381193721179851, `5%` = -0.377548729944066, `5%` = -0.367502266173254, 
`5%` = -0.365189621629917, `5%` = -0.372138950634624, `5%` = -0.387958726039597)
c(`95%` = 0.361246170270507, `95%` = 0.363583567124765, `95%` = 0.376787061804658, `95%` = 0.36591934655417, `95%` = 0.366191259259638, `95%` = 0.359677428221111, `95%` = 0.350690278574222, `95%` = 0.368397169620133, `95%` = 0.368517136449319, `95%` = 0.37350489237439, `95%` = 0.302328614573726, `95%` = 0.36401458422603, `95%` = 0.340469607680822, `95%` = 0.351135663837146, `95%` = 0.367203503126038, `95%` = 0.361676244869204, `95%` = 0.370683861620747, `95%` = 0.37767824418145, `95%` = 0.365557221714353, 
`95%` = 0.383953453100623, `95%` = 0.357532737242623, `95%` = 0.376649435010025)
