c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.0379222039996637, -0.00951521433050643, -0.0357669209565548, -0.0289858802339238, -0.0384045782213899, -0.0354852935888951, -0.195806801668196, -0.0319728051993748, -0.064502474892061, -0.0359000714018003, -0.209385718567549, -0.0293405266823335, -0.166256613851307, -0.204154479367649, -0.343021435135372, 0.0429675640807533, -0.031540048708067, -0.0346985641986963, -0.0303375281259717, -0.13391213882268, -0.0315874427691754, -0.0292508480128129)
c(`2.5%` = -0.670177498740691, `2.5%` = -0.606574716528012, `2.5%` = -0.660124076867341, `2.5%` = -0.658500223161749, `2.5%` = -0.673266724039317, `2.5%` = -0.693646849412836, `2.5%` = -0.917059388708302, `2.5%` = -0.662394912651839, `2.5%` = -0.67991481986874, `2.5%` = -0.670316698080103, `2.5%` = -0.83183723815622, `2.5%` = -0.663476379211969, `2.5%` = -0.854735257874132, `2.5%` = -0.918576287776926, `2.5%` = -0.963532341357661, `2.5%` = -0.495917243186253, `2.5%` = -0.64751983879636, `2.5%` = -0.673951139603439, 
`2.5%` = -0.665804518054749, `2.5%` = -0.791664538636436, `2.5%` = -0.643761100670645, `2.5%` = -0.680737220370752)
c(`97.5%` = 0.579428469021833, `97.5%` = 0.640138775494956, `97.5%` = 0.596180548733038, `97.5%` = 0.619030332938483, `97.5%` = 0.597678927212641, `97.5%` = 0.6121441149317, `97.5%` = 0.323295322658126, `97.5%` = 0.590730699845894, `97.5%` = 0.503098249043251, `97.5%` = 0.607349406190736, `97.5%` = 0.228895375416542, `97.5%` = 0.624129832779025, `97.5%` = 0.342536899260382, `97.5%` = 0.307896298234294, `97.5%` = 0.0903633166835597, `97.5%` = 0.686527591660775, `97.5%` = 0.616181981700487, `97.5%` = 0.599647736473311, 
`97.5%` = 0.609123918623858, `97.5%` = 0.415337198000103, `97.5%` = 0.597111489383847, `97.5%` = 0.632428409170173)
c(`5%` = -0.530855657109975, `5%` = -0.487829039222839, `5%` = -0.530023192811465, `5%` = -0.516610981668542, `5%` = -0.524022832574353, `5%` = -0.537218989651104, `5%` = -0.75728605285178, `5%` = -0.517067859106373, `5%` = -0.547235882003818, `5%` = -0.536626649173697, `5%` = -0.691946442016388, `5%` = -0.52266339334223, `5%` = -0.70021531860572, `5%` = -0.769560225018392, `5%` = -0.844315621869912, `5%` = -0.393051567766974, `5%` = -0.519010088416499, `5%` = -0.529941857869653, `5%` = -0.52218968602785, 
`5%` = -0.648665425674694, `5%` = -0.520022794035758, `5%` = -0.521893002755623)
c(`95%` = 0.449851048402911, `95%` = 0.496036928523184, `95%` = 0.452249441742121, `95%` = 0.47353271148754, `95%` = 0.454890426424996, `95%` = 0.474673790264394, `95%` = 0.22238953047732, `95%` = 0.44333608430914, `95%` = 0.387054472484903, `95%` = 0.475167927437824, `95%` = 0.156987753663085, `95%` = 0.473536190521047, `95%` = 0.254381363435638, `95%` = 0.217911529700368, `95%` = 0.0348859178585696, `95%` = 0.552104217589191, `95%` = 0.462090261872998, `95%` = 0.456310261272674, `95%` = 0.474214855342067, 
`95%` = 0.307884811241422, `95%` = 0.465192052817642, `95%` = 0.472198045319103)
