c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.000505821125346685, 0.045620786014229, -0.00525743090751, -0.00499600218282098, -0.000585600111380386, -0.00276881425069573, -0.13143407853664, -0.0036185203171912, 0.051697644596875, -0.0107891870271464, 0.32478426535094, -0.00145937361475847, 0.0136500560555857, -0.0738493576307788, -0.476611882301335, 0.0222560987441026, -0.00414548910371886, -0.0104742177218119, -0.00809846939246779, 0.0426395752164606, -0.0115019802718463, -0.00996274304864821)
c(`2.5%` = -0.701450360691855, `2.5%` = -0.63003373124748, `2.5%` = -0.715622145882045, `2.5%` = -0.727044467579978, `2.5%` = -0.747738822953945, `2.5%` = -0.735270274057596, `2.5%` = -0.907802053311157, `2.5%` = -0.733860049506474, `2.5%` = -0.622045682166618, `2.5%` = -0.742120219363362, `2.5%` = -0.243402705068146, `2.5%` = -0.735852738037434, `2.5%` = -0.666840078342412, `2.5%` = -0.798071774552942, `2.5%` = -1.42904260420137, `2.5%` = -0.64696023851359, `2.5%` = -0.746859618917552, `2.5%` = -0.739101938071361, 
`2.5%` = -0.730727303837492, `2.5%` = -0.626446320243322, `2.5%` = -0.750902816931559, `2.5%` = -0.743675008324717)
c(`97.5%` = 0.732116835481222, `97.5%` = 0.789641535896855, `97.5%` = 0.73726328358774, `97.5%` = 0.702602048400459, `97.5%` = 0.722592110325922, `97.5%` = 0.745772208274965, `97.5%` = 0.469638387064318, `97.5%` = 0.740059158395697, `97.5%` = 0.802350604222116, `97.5%` = 0.729903013043148, `97.5%` = 1.23628887068288, `97.5%` = 0.735322757301528, `97.5%` = 0.721254548490607, `97.5%` = 0.547821159342026, `97.5%` = 0.0901610144027345, `97.5%` = 0.724174566356542, `97.5%` = 0.75034324181327, `97.5%` = 0.709982748482133, 
`97.5%` = 0.719605886783329, `97.5%` = 0.774791684477986, `97.5%` = 0.735072184820506, `97.5%` = 0.723815080592094)
c(`5%` = -0.558975272641589, `5%` = -0.481208746850505, `5%` = -0.558122801520996, `5%` = -0.566607488065583, `5%` = -0.571443956067767, `5%` = -0.560863708568709, `5%` = -0.733995288939712, `5%` = -0.573157666695002, `5%` = -0.481699496200734, `5%` = -0.584184368190383, `5%` = -0.164285973529124, `5%` = -0.561811722478321, `5%` = -0.511640963000957, `5%` = -0.649098498864267, `5%` = -1.24192236504004, `5%` = -0.514000899450722, `5%` = -0.573055024907531, `5%` = -0.589897724557502, `5%` = -0.576009342907356, 
`5%` = -0.483515522092064, `5%` = -0.59377439249432, `5%` = -0.589781985563434)
c(`95%` = 0.558241074532826, `95%` = 0.6343107609265, `95%` = 0.564064518165769, `95%` = 0.554270165096566, `95%` = 0.568906077580551, `95%` = 0.564421378888805, `95%` = 0.361698139473533, `95%` = 0.556521770858677, `95%` = 0.636739588170121, `95%` = 0.554481744418514, `95%` = 1.05804976340078, `95%` = 0.564219400738208, `95%` = 0.570750639989039, `95%` = 0.424983622057134, `95%` = 0.0339253948301201, `95%` = 0.576987914910334, `95%` = 0.588745135323456, `95%` = 0.565535664200477, `95%` = 0.572292114386171, 
`95%` = 0.614652923649533, `95%` = 0.564155780832837, `95%` = 0.568721991063375)
