c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.101703799949395, -0.564637906246216, -0.0956910914293675, -0.00337692444405644, -0.0816048428798888, -6.35740684684093e-05, -0.667659588573525, -0.00405812351552042, 1.42004536167462, -0.171009890912524, 0.683653688372939, 0.00344017290368172, 0.260625956246919, -1.41625310169202, 0.470951452129627, 0.208110428258286, 0.00250209506601534, -0.00562874748733102, -0.105857797157013, 0.344654754591335, 0.0027807037509892, -0.0552183959035103)
c(`2.5%` = -1.51590135737519, `2.5%` = -1.842080521195, `2.5%` = -1.52784116663569, `2.5%` = -1.39142200782843, `2.5%` = -1.46567361056997, `2.5%` = -1.42253864934177, `2.5%` = -1.84852850564476, `2.5%` = -1.35828695365276, `2.5%` = 0.166228321710892, `2.5%` = -1.56024033377577, `2.5%` = -0.0715480521081878, `2.5%` = -1.39463661876756, `2.5%` = -1.00766752361942, `2.5%` = -2.60148475745005, `2.5%` = 0.0825563723532098, `2.5%` = -0.483919695463572, `2.5%` = -1.40349956302864, `2.5%` = -1.38403675822353, 
`2.5%` = -1.53199462919355, `2.5%` = -0.81212639023518, `2.5%` = -1.34556223161126, `2.5%` = -1.46894825626173)
c(`97.5%` = 1.23043134810689, `97.5%` = 0.516158819481392, `97.5%` = 1.27757713500863, `97.5%` = 1.34564557876177, `97.5%` = 1.25686631205631, `97.5%` = 1.4133810381728, `97.5%` = 0.333296222901717, `97.5%` = 1.3394057445905, `97.5%` = 3.03047315901632, `97.5%` = 1.09705630948954, `97.5%` = 1.47768415582758, `97.5%` = 1.42305354019587, `97.5%` = 1.69446395582928, `97.5%` = -0.457781574665431, `97.5%` = 0.869227382956849, `97.5%` = 0.860804399758541, `97.5%` = 1.39777584880611, `97.5%` = 1.32536002712745, 
`97.5%` = 1.22054546483929, `97.5%` = 1.64628843970952, `97.5%` = 1.40043610000601, `97.5%` = 1.32705054827579)
c(`5%` = -1.23554421440395, `5%` = -1.60865719854905, `5%` = -1.26990351126472, `5%` = -1.10623630944065, `5%` = -1.20092272626125, `5%` = -1.14277805533658, `5%` = -1.61987740240911, `5%` = -1.10114220997093, `5%` = 0.325020098610294, `5%` = -1.28688609021933, `5%` = 0.0437719361245331, `5%` = -1.13051681084733, `5%` = -0.774388773799267, `5%` = -2.39673285825223, `5%` = 0.140776593909285, `5%` = -0.358913993804725, `5%` = -1.12240343354847, `5%` = -1.13264764154031, `5%` = -1.25936194261107, `5%` = -0.619677989159712, 
`5%` = -1.12306907889816, `5%` = -1.19574516476068)
c(`95%` = 0.9962993915319, `95%` = 0.344271026201751, `95%` = 1.02585852524287, `95%` = 1.11395208896461, `95%` = 1.0103835099505, `95%` = 1.11961350598891, `95%` = 0.192677426246452, `95%` = 1.10063510284539, `95%` = 2.71868187996996, `95%` = 0.899896640181501, `95%` = 1.35108734959306, `95%` = 1.14893128770879, `95%` = 1.39113469911214, `95%` = -0.579922080756115, `95%` = 0.805026483916245, `95%` = 0.757665883111782, `95%` = 1.12853607517645, `95%` = 1.09611509546288, `95%` = 0.961250543645123, 
`95%` = 1.41171899585957, `95%` = 1.10399402315835, `95%` = 1.04723154370974)
