c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.12331418463673, -0.643524712834449, -0.155293145618607, -0.00107765414463224, -0.14822283281126, 0.00881755884088804, -0.426662961246809, -0.0178268855590179, -0.180236471981648, -0.290840496837507, -0.420548263203837, -0.00380033220537924, -1.41311346802269, 1.52446064588643, -1.2444367751168, 2.932306880193, 0.00169846910876418, -0.00893420267820256, -0.235385994622511, -0.71289290741607, -0.00820736853904142, -0.12592765159372)
c(`2.5%` = -2.02564979096055, `2.5%` = -2.39439013494348, `2.5%` = -1.99208722130077, `2.5%` = -1.83809201587386, `2.5%` = -2.00373524711419, `2.5%` = -1.87235054261414, `2.5%` = -1.58611083836008, `2.5%` = -1.81806137603714, `2.5%` = -1.24185484456687, `2.5%` = -2.12331233705335, `2.5%` = -1.22916631970868, `2.5%` = -1.87838853425636, `2.5%` = -3.401492690184, `2.5%` = 0.527275445018903, `2.5%` = -1.78375367793506, `2.5%` = 1.32770940293854, `2.5%` = -1.89529361773991, `2.5%` = -1.9106750132439, 
`2.5%` = -2.02803126368439, `2.5%` = -2.47632399275718, `2.5%` = -1.86122689687105, `2.5%` = -2.00542308533653)
c(`97.5%` = 1.67969744861974, `97.5%` = 0.935428242477581, `97.5%` = 1.6348058321464, `97.5%` = 1.81710270358056, `97.5%` = 1.63450278223622, `97.5%` = 1.88045146010562, `97.5%` = 0.676762640081955, `97.5%` = 1.78906314682073, `97.5%` = 0.850790497217344, `97.5%` = 1.47057766493624, `97.5%` = 0.39318191253476, `97.5%` = 1.88452418451776, `97.5%` = 0.199302958070319, `97.5%` = 2.69049448523487, `97.5%` = -0.71625139500421, `97.5%` = 4.8161142366925, `97.5%` = 1.90068098208742, `97.5%` = 1.88773849773307, 
`97.5%` = 1.47639661532028, `97.5%` = 0.803673159441113, `97.5%` = 1.86049650391514, `97.5%` = 1.71917016589104)
c(`5%` = -1.66549179341294, `5%` = -2.05805403972291, `5%` = -1.66084826903427, `5%` = -1.50609037865979, `5%` = -1.62666028114303, `5%` = -1.53803827380169, `5%` = -1.374497411387, `5%` = -1.50464058833537, `5%` = -1.07057709615347, `5%` = -1.79986867754153, `5%` = -1.10318164735297, `5%` = -1.56027911708145, `5%` = -3.03473408528801, `5%` = 0.677198726234082, `5%` = -1.69975002339859, `5%` = 1.56455100307583, `5%` = -1.54500435851042, `5%` = -1.54650472228178, `5%` = -1.71550508080056, `5%` = -2.16966249843568, 
`5%` = -1.51253234614188, `5%` = -1.68286480200484)
c(`95%` = 1.38012867025627, `95%` = 0.661680376811838, `95%` = 1.31572988103649, `95%` = 1.49439855925108, `95%` = 1.31428822112951, `95%` = 1.54140325707139, `95%` = 0.491906288928273, `95%` = 1.47557433066007, `95%` = 0.6825129130599, `95%` = 1.15276028747074, `95%` = 0.262600483963485, `95%` = 1.54587386125945, `95%` = -0.0370570732959479, `95%` = 2.46984046267875, `95%` = -0.79680171298815, `95%` = 4.4435402069247, `95%` = 1.53642174870284, `95%` = 1.54093350572683, `95%` = 1.19508577316775, 
`95%` = 0.585314360782336, `95%` = 1.5156111408874, `95%` = 1.37175745000343)
