c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.0295164133163417, -0.0430143836673774, -0.0339902806330816, -0.0260159056108803, -0.0333554671965411, -0.028359266287689, -0.0353319092798262, -0.0187357101597514, -0.1350166586327, -0.0260977976963767, -0.0993758150556964, -0.0236033005860729, -0.101687967791986, 0.100124327907652, -0.412146324077768, -0.0605258874521727, -0.024078230002875, -0.0269598652137639, -0.0274504939892296, -0.174849840107956, -0.0222497943593906, -0.0274902413057739)
c(`2.5%` = -0.646070710340414, `2.5%` = -0.683290321643176, `2.5%` = -0.675081729811003, `2.5%` = -0.648421169748859, `2.5%` = -0.650918866487675, `2.5%` = -0.668055634029354, `2.5%` = -0.617973586189941, `2.5%` = -0.640444657164909, `2.5%` = -0.841164238146927, `2.5%` = -0.670733739121956, `2.5%` = -0.649453534111085, `2.5%` = -0.635643676510193, `2.5%` = -0.75353018780598, `2.5%` = -0.406446255373983, `2.5%` = -0.990046725218716, `2.5%` = -0.668423764362022, `2.5%` = -0.65459523058199, `2.5%` = -0.623518595242253, 
`2.5%` = -0.639580335809163, `2.5%` = -0.853225149285778, `2.5%` = -0.651372688023807, `2.5%` = -0.665950740608084)
c(`97.5%` = 0.622118536783365, `97.5%` = 0.567754232733557, `97.5%` = 0.594665290830079, `97.5%` = 0.595712650833978, `97.5%` = 0.586408105812293, `97.5%` = 0.61702506930373, `97.5%` = 0.557141349785682, `97.5%` = 0.64037824695388, `97.5%` = 0.422370584061102, `97.5%` = 0.619806919714738, `97.5%` = 0.368644030362086, `97.5%` = 0.596438871658726, `97.5%` = 0.456963518658231, `97.5%` = 0.797719164264997, `97.5%` = 0.0176791224477116, `97.5%` = 0.524706569957862, `97.5%` = 0.622703525731803, `97.5%` = 0.570789155361791, 
`97.5%` = 0.59747717452121, `97.5%` = 0.313015825195173, `97.5%` = 0.627269012162122, `97.5%` = 0.615198351898292)
c(`5%` = -0.510251564339674, `5%` = -0.52441458740886, `5%` = -0.532441957391025, `5%` = -0.518410421043954, `5%` = -0.521557208692412, `5%` = -0.521871400612245, `5%` = -0.508832891153791, `5%` = -0.518203720240489, `5%` = -0.674921145513311, `5%` = -0.531996138266231, `5%` = -0.52192353020523, `5%` = -0.500496765978635, `5%` = -0.598975479040644, `5%` = -0.316960032380135, `5%` = -0.880856751562785, `5%` = -0.540693659717227, `5%` = -0.519375237016899, `5%` = -0.509904935942235, `5%` = -0.513849598148613, 
`5%` = -0.69853877504723, `5%` = -0.511181165016275, `5%` = -0.520466766457042)
c(`95%` = 0.471281041217163, `95%` = 0.423703175708398, `95%` = 0.466378617261805, `95%` = 0.454221478113165, `95%` = 0.458661660656351, `95%` = 0.460036483429395, `95%` = 0.445024272718964, `95%` = 0.492401099446282, `95%` = 0.315064862057188, `95%` = 0.475963967540287, `95%` = 0.282609130587132, `95%` = 0.45986621483045, `95%` = 0.334682947415185, `95%` = 0.636944255371381, `95%` = -0.0294487230376872, `95%` = 0.404566643306311, `95%` = 0.478649635433352, `95%` = 0.441853123918437, `95%` = 0.463352362829126, 
`95%` = 0.228050943041459, `95%` = 0.482992956431603, `95%` = 0.466730867021221)
