c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.00224061119544955, -0.0498803962359136, 0.0029866500758097, 0.0092020834745846, -0.00557138538681874, 0.00139701841247001, 0.208644014756123, 0.00486415637216138, -0.0297390835449691, 0.00664076692247885, 0.020489615259928, 0.00270098452440913, 0.0828587018493729, 0.115533405660669, -0.140862225354917, -0.0954924005742835, 0.00218728416741836, 0.00490518108019053, -0.000597898274967985, 0.0531332616653892, 0.00140665840745891, 0.00267108484868849)
c(`2.5%` = -0.573130925585206, `2.5%` = -0.631300654586586, `2.5%` = -0.549248794254278, `2.5%` = -0.526524124449695, `2.5%` = -0.547236884821695, `2.5%` = -0.525794262806427, `2.5%` = -0.233024875361211, `2.5%` = -0.531351924132048, `2.5%` = -0.577014239447581, `2.5%` = -0.526231597802405, `2.5%` = -0.429251090289663, `2.5%` = -0.539844609215633, `2.5%` = -0.376439176914794, `2.5%` = -0.329263294357893, `2.5%` = -0.614365567191018, `2.5%` = -0.702986558104766, `2.5%` = -0.548813703529005, `2.5%` = -0.549035834183446, 
`2.5%` = -0.55240500338214, `2.5%` = -0.42852558763013, `2.5%` = -0.532991842266845, `2.5%` = -0.561981734264935)
c(`97.5%` = 0.535870607314021, `97.5%` = 0.439183977577692, `97.5%` = 0.531820860628844, `97.5%` = 0.557228636508852, `97.5%` = 0.521616619266678, `97.5%` = 0.521530978763819, `97.5%` = 0.947611094270466, `97.5%` = 0.551470726780118, `97.5%` = 0.439020973201874, `97.5%` = 0.543800507198643, `97.5%` = 0.487394572761673, `97.5%` = 0.537619293317655, `97.5%` = 0.696764948267981, `97.5%` = 0.740236931779179, `97.5%` = 0.205381626274404, `97.5%` = 0.352194753343582, `97.5%` = 0.553383244915363, `97.5%` = 0.559402688668633, 
`97.5%` = 0.550312950172821, `97.5%` = 0.622393397809352, `97.5%` = 0.536869755062453, `97.5%` = 0.557804559325436)
c(`5%` = -0.428266097170789, `5%` = -0.491562554012717, `5%` = -0.411292594357374, `5%` = -0.403177595011685, `5%` = -0.425566130863293, `5%` = -0.404058425652893, `5%` = -0.159905839522464, `5%` = -0.416161496643271, `5%` = -0.449023424748452, `5%` = -0.399764467982059, `5%` = -0.340507185356601, `5%` = -0.420233862640142, `5%` = -0.283655680952849, `5%` = -0.244951545599123, `5%` = -0.521580687834855, `5%` = -0.55490968224003, `5%` = -0.422336361660143, `5%` = -0.422015963935169, `5%` = -0.420900175948769, 
`5%` = -0.330171694279594, `5%` = -0.41323722677094, `5%` = -0.42744212405137)
c(`95%` = 0.404392809444781, `95%` = 0.333871293266063, `95%` = 0.417529613693018, `95%` = 0.430463617558602, `95%` = 0.402307136842525, `95%` = 0.410955507727826, `95%` = 0.766303524326403, `95%` = 0.430330128267061, `95%` = 0.341991702173203, `95%` = 0.419913772461363, `95%` = 0.386482609592056, `95%` = 0.421100502019285, `95%` = 0.544517445336076, `95%` = 0.586186029847553, `95%` = 0.150938308973965, `95%` = 0.268009451996814, `95%` = 0.425628186353177, `95%` = 0.433826523724275, `95%` = 0.417184121248096, 
`95%` = 0.486396526448576, `95%` = 0.410430471444198, `95%` = 0.43788787573263)
