c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.033444959026225, -0.00793522059592051, -0.0336009736151623, -0.0316339144412533, -0.0405372878690479, -0.0414663539452286, -0.20912536018799, -0.0266756188322575, -0.062701663439268, -0.0331874740057613, -0.219385658942507, -0.0325137781481118, -0.175613009906426, -0.211716341147135, -0.358974070196284, 0.0439801430116134, -0.0306047651482687, -0.032498476375438, -0.0371883825844407, -0.140469476402341, -0.0333940650001783, -0.0354885056744574)
c(`2.5%` = -0.666923716865872, `2.5%` = -0.64102067023692, `2.5%` = -0.677795179892062, `2.5%` = -0.670757215379559, `2.5%` = -0.700807445098139, `2.5%` = -0.693814265711575, `2.5%` = -0.945439609291323, `2.5%` = -0.649489899228185, `2.5%` = -0.680839523831996, `2.5%` = -0.69007268009126, `2.5%` = -0.81900840565343, `2.5%` = -0.679848629284621, `2.5%` = -0.892050792681191, `2.5%` = -0.936591248518692, `2.5%` = -0.959715545078129, `2.5%` = -0.52071567059202, `2.5%` = -0.684856132016299, `2.5%` = -0.682381096206198, 
`2.5%` = -0.682121426892847, `2.5%` = -0.818237407714228, `2.5%` = -0.644091572578507, `2.5%` = -0.695950746544654)
c(`97.5%` = 0.62590334980134, `97.5%` = 0.653919501490395, `97.5%` = 0.641015835184623, `97.5%` = 0.629010798078368, `97.5%` = 0.626632265835835, `97.5%` = 0.605986429897587, `97.5%` = 0.315669435320966, `97.5%` = 0.629421610550102, `97.5%` = 0.522372341682048, `97.5%` = 0.611617883076929, `97.5%` = 0.239595636184448, `97.5%` = 0.614136402646953, `97.5%` = 0.370881206753106, `97.5%` = 0.314398740452913, `97.5%` = 0.0761919118896935, `97.5%` = 0.714311594742576, `97.5%` = 0.62707456073199, `97.5%` = 0.660256568215515, 
`97.5%` = 0.614029672287225, `97.5%` = 0.415680090003177, `97.5%` = 0.590770974069619, `97.5%` = 0.638335616472465)
c(`5%` = -0.534614253816882, `5%` = -0.492652438031023, `5%` = -0.534510689945915, `5%` = -0.537204763734244, `5%` = -0.561400134198236, `5%` = -0.554901107934352, `5%` = -0.770582950456033, `5%` = -0.526625109409884, `5%` = -0.557990156682396, `5%` = -0.545095270800367, `5%` = -0.702502858669705, `5%` = -0.532227460109175, `5%` = -0.726956896133474, `5%` = -0.776805336768321, `5%` = -0.860866809127253, `5%` = -0.416255094218329, `5%` = -0.540848631429852, `5%` = -0.545406019188074, `5%` = -0.556323223126082, 
`5%` = -0.66997803833358, `5%` = -0.528524246946612, `5%` = -0.557925242336448)
c(`95%` = 0.477502832552862, `95%` = 0.513718992636229, `95%` = 0.489098182794968, `95%` = 0.480711435248938, `95%` = 0.475022207136582, `95%` = 0.474127651026557, `95%` = 0.224931630208054, `95%` = 0.491419189883086, `95%` = 0.412334948233884, `95%` = 0.482084498841415, `95%` = 0.169351071503387, `95%` = 0.478552110978265, `95%` = 0.268210851959822, `95%` = 0.22352188185812, `95%` = 0.0202098111117333, `95%` = 0.569378098960284, `95%` = 0.485945600247666, `95%` = 0.497377449520452, `95%` = 0.472090491001111, 
`95%` = 0.315101103321463, `95%` = 0.458319237867322, `95%` = 0.490829889891898)
