c("Blood & Immune system", "Circulatory", "Congential", "Contact with Healthcare", "Digestive", "Ear and Mastoid", "Endocrine, Nutritional, and Metabolic", "External Causes", "Eye and Adnexa", "Genitourinary", "Infections & Parasites", "Injury etc.", "Mental & Behavioral", "Musculoskeletal", "Neoplasms", "Nervous System", "Perinatal Period", "Pregancy, Childbirth, & Puerperium", "Respiratory", "Skin & Subcutaneaous tissue", "Special Purposes", "Symptoms, Signs etc.")
c(-0.00232413253272223, -0.00152293417694882, -0.00353563813667985, -0.00310660613711883, -0.00533663159113219, -0.00305599644590309, -0.0110760315296536, -0.00588960985826809, -0.00370684105270185, -0.00470552774062355, -0.026301838156295, -0.00292165177766262, -0.0129978772390341, -0.00183935600163672, -0.00267878134821512, -0.00220242035797092, -0.000914878424206371, -0.00258882299014672, 0.000504336438586614, -0.000991729207921393, -0.000800806458059062, -0.00386686775250893)
c(`2.5%` = -0.479474973075092, `2.5%` = -0.472669740624549, `2.5%` = -0.464039194626794, `2.5%` = -0.473392603483428, `2.5%` = -0.478359030066064, `2.5%` = -0.455950775505214, `2.5%` = -0.485658627931781, `2.5%` = -0.485882001168744, `2.5%` = -0.462623364969651, `2.5%` = -0.464633556660333, `2.5%` = -0.52584405348817, `2.5%` = -0.46165946058897, `2.5%` = -0.494462890468011, `2.5%` = -0.457818242374006, `2.5%` = -0.477380824369578, `2.5%` = -0.467981470659442, `2.5%` = -0.462006993832474, `2.5%` = -0.475538447435748, 
`2.5%` = -0.459119942403029, `2.5%` = -0.457007790658148, `2.5%` = -0.457457906185736, `2.5%` = -0.463105985034812)
c(`97.5%` = 0.472157783917002, `97.5%` = 0.465334754332652, `97.5%` = 0.444423983236463, `97.5%` = 0.450919265047758, `97.5%` = 0.452833279685459, `97.5%` = 0.451291140159942, `97.5%` = 0.447738518135558, `97.5%` = 0.47182876476933, `97.5%` = 0.450642071977278, `97.5%` = 0.460733730501955, `97.5%` = 0.404201638523238, `97.5%` = 0.463075602426935, `97.5%` = 0.435596577978869, `97.5%` = 0.452102307502102, `97.5%` = 0.485090234449767, `97.5%` = 0.46197268399125, `97.5%` = 0.471768785447442, `97.5%` = 0.469214434976901, 
`97.5%` = 0.458559371773605, `97.5%` = 0.473772689053127, `97.5%` = 0.468011769036541, `97.5%` = 0.460260492516532)
c(`5%` = -0.362566524131353, `5%` = -0.365391855607623, `5%` = -0.356688829996404, `5%` = -0.360094627174451, `5%` = -0.354956928534609, `5%` = -0.35377118365327, `5%` = -0.37653437100647, `5%` = -0.370648036848808, `5%` = -0.364772370803702, `5%` = -0.363091670495567, `5%` = -0.40133526307109, `5%` = -0.359038021511569, `5%` = -0.37607446715096, `5%` = -0.356984822002284, `5%` = -0.371058543649785, `5%` = -0.352812984615348, `5%` = -0.357581652703343, `5%` = -0.357584782489892, `5%` = -0.358080523145794, 
`5%` = -0.350248519811252, `5%` = -0.359275569693152, `5%` = -0.355239427293753)
c(`95%` = 0.349080687253274, `95%` = 0.362582528037606, `95%` = 0.344628062144889, `95%` = 0.343429488771613, `95%` = 0.34504055978718, `95%` = 0.347420792879581, `95%` = 0.328780688143198, `95%` = 0.352000827804009, `95%` = 0.35762381742188, `95%` = 0.353870410467441, `95%` = 0.316946023033097, `95%` = 0.352512087776552, `95%` = 0.333041306872968, `95%` = 0.343376182190238, `95%` = 0.368527660640565, `95%` = 0.353283663339729, `95%` = 0.354267255995946, `95%` = 0.347884235465927, `95%` = 0.352698507186818, 
`95%` = 0.355492422245274, `95%` = 0.354508762801702, `95%` = 0.347938178694997)
