\documentclass[../Main.tex]{subfiles}
\graphicspath{{\subfix{Assets/img/}}}

\begin{document}
\subsection{Diagnostics}
Reported low E-BFMI scores (low is considered below $0.2$)
\todo{Fill these out based on what is in the rendered report.}
\begin{itemize}
    \item Chain 1: 0.178
    \item Chain 2: 0.189
\end{itemize}

No other reported issues.

\begin{figure}[H]
    \caption{Diagnostics: Trace Rank Plots - $\mu$}
    \label{fig:trial_durations}
    \includegraphics[width=\textwidth]{../assets/img/diagnostics/trace_rank_plot_mu_1-4}
    \\[\smallskipamount]
    \includegraphics[width=\textwidth]{../assets/img/diagnostics/trace_rank_plot_mu_5-8}
    \\[\smallskipamount]
    \includegraphics[width=\textwidth]{../assets/img/diagnostics/trace_rank_plot_mu_9-12}
\end{figure}
Mixing seems to be fine

\begin{figure}[H]
    \caption{Diagnostics: Trace Rank Plots - $\sigma$}
    \label{fig:trial_durations}
    \includegraphics[width=\textwidth]{../assets/img/diagnostics/trace_rank_plot_sigma_1-4}
    \\[\smallskipamount]
    \includegraphics[width=\textwidth]{../assets/img/diagnostics/trace_rank_plot_sigma_5-8}
    \\[\smallskipamount]
    \includegraphics[width=\textwidth]{../assets/img/diagnostics/trace_rank_plot_sigma_9-12}
\end{figure}
Mixing is slower than $\mu$ values, but doesn't seem too problematic in light of
other deficencies such as low number of observations.

\end{document}
